truncate table iot_alert_log;
truncate table iot_device;
truncate table iot_device_log;
truncate table iot_event_log;
truncate table iot_function_log;
truncate table iot_product;
truncate table iot_things_model;
truncate table news;
truncate table notify_log;
truncate table sys_job_log;


